<!-- Page de détails des parametres -->

<template>
  <LayoutContainer>

      <v-row justify="center" align="center" class="bannerTopForm mt-5">
        <v-col cols="12" class="ot_dark_grey ot_white--text">
          <h4>Paramètres</h4>
        </v-col>
      </v-row>

    <!-- Rend le contenu de la page -->
    <NuxtChild />
  </LayoutContainer>
</template>

<script lang="ts">
import { defineComponent } from '@nuxtjs/composition-api'
import { repositoryHelper } from '~/services/store/repository'
import {Parameters} from "~/models/Organization/Parameters";

export default defineComponent({
  name: 'parameters',
  layout: 'parameters',
  setup () {
    return {}
  },
  beforeDestroy() {
    repositoryHelper.cleanRepository(Parameters)
  },
})

</script>
