<!-- Page de détails des paramètres -->

<template>
  <NuxtLayout name="parameters">
    <!-- Rend le contenu de la page -->
    <NuxtPage />
  </NuxtLayout>
</template>

<script setup lang="ts">
/**
 * Disable the default layout, the page will use the layout defined with <NuxtLayout />
 * @see https://nuxt.com/docs/guide/directory-structure/layouts#overriding-a-layout-on-a-per-page-basis
 */
definePageMeta({
  name: 'parameters_page',
  layout: false,
})

</script>

<style scoped lang="scss">
:deep(.v-table thead td) {
  color: rgb(var(--v-theme-on-primary-alt));
  font-weight: bold;
}
</style>
